X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4d5a0f67c6f127ad08548494cdddc5c89bb27194..93c4157c6cf8603eaba7ebbbc3b1e7bd303d8241:/docs/latex/wx/activevt.tex?ds=sidebyside

diff --git a/docs/latex/wx/activevt.tex b/docs/latex/wx/activevt.tex
index 54102fe920..5d9c5ff4dc 100644
--- a/docs/latex/wx/activevt.tex
+++ b/docs/latex/wx/activevt.tex
@@ -34,7 +34,7 @@ or a frame becomes inactivate resulting in all application frames being inactive
 
 \wxheading{See also}
 
-\helpref{wxWindow::OnActivate}{wxwindowonactivate},\rtfsp
+%\helpref{wxWindow::OnActivate}{wxwindowonactivate},\rtfsp
 %% GD: OnXXX functions are not documented
 %%\helpref{wxApp::OnActivate}{wxapponactivate},\rtfsp
 \helpref{Event handling overview}{eventhandlingoverview}
