X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4d1cbdbe17950bc5c8bc0b9fd126e27cfbd0f835..d1be6261e3403e69bbd5694df008f1edfda06eef:/docs/latex/wx/datistrm.tex

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 2bff0f65e6..158ffffb2e 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -67,7 +67,7 @@ Destroys the wxDataInputStream object.
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be read in big-endian
+If {\it be\_order} is true, all data will be read in big-endian
 order, such as written by programs on a big endian architecture 
 (e.g. Sparc) or written by Java-Streams (which always use 
 big-endian order).
