X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4d1cbdbe17950bc5c8bc0b9fd126e27cfbd0f835..afbdbdb491884557f4f510f9749c0c7580b50795:/docs/latex/wx/datistrm.tex?ds=sidebyside

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 2bff0f65e6..1cec62695d 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -67,7 +67,7 @@ Destroys the wxDataInputStream object.
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be read in big-endian
+If {\it be\_order} is true, all data will be read in big-endian
 order, such as written by programs on a big endian architecture 
 (e.g. Sparc) or written by Java-Streams (which always use 
 big-endian order).
@@ -78,30 +78,55 @@ big-endian order).
 
 Reads a single byte from the stream.
 
+\func{void}{Read8}{\param{wxUint8 *}{buffer}, \param{size\_t }{size}}
+
+Reads bytes from the stream in a specified buffer. The amount of
+bytes to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::Read16}
 
 \func{wxUint16}{Read16}{\void}
 
 Reads a 16 bit unsigned integer from the stream.
 
+\func{void}{Read16}{\param{wxUint16 *}{buffer}, \param{size\_t }{size}}
+
+Reads 16 bit unsigned integers from the stream in a specified buffer. the
+amount of 16 bit unsigned integer to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::Read32}
 
 \func{wxUint32}{Read32}{\void}
 
 Reads a 32 bit unsigned integer from the stream.
 
+\func{void}{Read32}{\param{wxUint32 *}{buffer}, \param{size\_t }{size}}
+
+Reads 32 bit unsigned integers from the stream in a specified buffer. the amount of
+32 bit unsigned integer to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::Read64}
 
 \func{wxUint64}{Read64}{\void}
 
 Reads a 64 bit unsigned integer from the stream.
 
+\func{void}{Read64}{\param{wxUint64 *}{buffer}, \param{size\_t }{size}}
+
+Reads 64 bit unsigned integers from the stream in a specified buffer. the amount of
+64 bit unsigned integer to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::ReadDouble}
 
 \func{double}{ReadDouble}{\void}
 
 Reads a double (IEEE encoded) from the stream.
 
+\func{void}{ReadDouble}{\param{double *}{buffer}, \param{size\_t }{size}}
+
+Reads double data (IEEE encoded) from the stream in a specified buffer. the amount of
+double to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::ReadString}\label{wxdatainputstreamreadstring}
 
 \func{wxString}{ReadString}{\void}
