X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4d1cbdbe17950bc5c8bc0b9fd126e27cfbd0f835..42bf070c7e17428344b476fdb500ab85f0b753df:/docs/latex/wx/datostrm.tex

diff --git a/docs/latex/wx/datostrm.tex b/docs/latex/wx/datostrm.tex
index 53616ac33d..c904e34f10 100644
--- a/docs/latex/wx/datostrm.tex
+++ b/docs/latex/wx/datostrm.tex
@@ -49,7 +49,7 @@ Destroys the wxDataOutputStream object.
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be written in big-endian
+If {\it be\_order} is true, all data will be written in big-endian
 order, e.g. for reading on a Sparc or from Java-Streams (which
 always use big-endian order), otherwise data will be written in
 little-endian order.
@@ -60,30 +60,55 @@ little-endian order.
 
 Writes the single byte {\it i8} to the stream.
 
+\func{void}{Write8}{\param{const wxUint8 *}{buffer}, \param{size\_t }{size}}
+
+Writes an array of bytes to the stream. The amount of bytes to write is
+specified with the {\it size} variable.
+
 \membersection{wxDataOutputStream::Write16}
 
 \func{void}{Write16}{{\param wxUint16 }{i16}}
 
 Writes the 16 bit unsigned integer {\it i16} to the stream.
 
+\func{void}{Write16}{\param{const wxUint16 *}{buffer}, \param{size\_t }{size}}
+
+Writes an array of 16 bit unsigned integer to the stream. The amount of
+16 bit unsigned integer to write is specified with the {\it size} variable.
+
 \membersection{wxDataOutputStream::Write32}
 
 \func{void}{Write32}{{\param wxUint32 }{i32}}
 
 Writes the 32 bit unsigned integer {\it i32} to the stream.
 
+\func{void}{Write32}{\param{const wxUint32 *}{buffer}, \param{size\_t }{size}}
+
+Writes an array of 32 bit unsigned integer to the stream. The amount of
+32 bit unsigned integer to write is specified with the {\it size} variable.
+
 \membersection{wxDataOutputStream::Write64}
 
 \func{void}{Write64}{{\param wxUint64 }{i64}}
 
 Writes the 64 bit unsigned integer {\it i64} to the stream.
 
+\func{void}{Write64}{\param{const wxUint64 *}{buffer}, \param{size\_t }{size}}
+
+Writes an array of 64 bit unsigned integer to the stream. The amount of
+64 bit unsigned integer to write is specified with the {\it size} variable.
+
 \membersection{wxDataOutputStream::WriteDouble}
 
 \func{void}{WriteDouble}{{\param double }{f}}
 
 Writes the double {\it f} to the stream using the IEEE format.
 
+\func{void}{WriteDouble}{\param{const double *}{buffer}, \param{size\_t }{size}}
+
+Writes an array of double to the stream. The amount of double to write is
+specified with the {\it size} variable.
+
 \membersection{wxDataOutputStream::WriteString}\label{wxdataoutputstreamwritestring}
 
 \func{void}{WriteString}{{\param const wxString\&}{string}}
