X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4d0f3cd6ac9b38521b35f21cb94ef7d72aa34b9e..4d01e58361f8e0d9a559ae8bb1646d13e2ba9198:/docs/latex/wx/notifevt.tex

diff --git a/docs/latex/wx/notifevt.tex b/docs/latex/wx/notifevt.tex
index bdd5ac9e01..c68b7eca8b 100644
--- a/docs/latex/wx/notifevt.tex
+++ b/docs/latex/wx/notifevt.tex
@@ -50,3 +50,4 @@ Prevents the change announced by this event from happening.
 It is in general a good idea to notify the user about the reasons for vetoing
 the change because otherwise the applications behaviour (which just refuses to
 do what the user wants) might be quite surprising.
+
