X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4d0f3cd6ac9b38521b35f21cb94ef7d72aa34b9e..265a3864bbbc7ac8af309c80321efbba8c0ca6e9:/docs/latex/wx/notifevt.tex

diff --git a/docs/latex/wx/notifevt.tex b/docs/latex/wx/notifevt.tex
index bdd5ac9e01..4e0bdcd98a 100644
--- a/docs/latex/wx/notifevt.tex
+++ b/docs/latex/wx/notifevt.tex
@@ -32,14 +32,23 @@ None
 
 \func{}{wxNotifyEvent}{\param{wxEventType}{ eventType = wxEVT\_NULL}, \param{int}{ id = 0}}
 
-Constructor (used internally by wxWindows only).
+Constructor (used internally by wxWidgets only).
+
+\membersection{wxNotifyEvent::Allow}\label{wxnotifyeventallow}
+
+\func{void}{Allow}{\void}
+
+This is the opposite of \helpref{Veto()}{wxnotifyeventveto}: it explicitly
+allows the event to be processed. For most events it is not necessary to call
+this method as the events are allowed anyhow but some are forbidden by default
+(this will be mentioned in the corresponding event description).
 
 \membersection{wxNotifyEvent::IsAllowed}\label{wxnotifyeventisallowed}
 
 \constfunc{bool}{IsAllowed}{\void}
 
-Returns TRUE if the change is allowed (\helpref{Veto()}{wxnotifyeventveto} 
-hasn't been called) or FALSE otherwise (if it was).
+Returns true if the change is allowed (\helpref{Veto()}{wxnotifyeventveto} 
+hasn't been called) or false otherwise (if it was).
 
 \membersection{wxNotifyEvent::Veto}\label{wxnotifyeventveto}
 
@@ -50,3 +59,4 @@ Prevents the change announced by this event from happening.
 It is in general a good idea to notify the user about the reasons for vetoing
 the change because otherwise the applications behaviour (which just refuses to
 do what the user wants) might be quite surprising.
+
