X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4cbc57f086cee690f397ac5622d3f1d7153b300e..a2615ebc22a402b1badb46475f94ab6aa3a64018:/contrib/docs/latex/fl/cbpanedrawplugin.tex

diff --git a/contrib/docs/latex/fl/cbpanedrawplugin.tex b/contrib/docs/latex/fl/cbpanedrawplugin.tex
index 550121ec09..b824a4b344 100644
--- a/contrib/docs/latex/fl/cbpanedrawplugin.tex
+++ b/contrib/docs/latex/fl/cbpanedrawplugin.tex
@@ -20,7 +20,7 @@ would be enough for the frame layout to function properly
 
 \wxheading{Include files}
 
-<panedrawpl.h>
+<wx/fl/panedrawpl.h>
 
 \wxheading{Data structures}
 
