X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4cbc57f086cee690f397ac5622d3f1d7153b300e..965b4f87d9d59c7c6d58da6567dca176d9131296:/contrib/docs/latex/fl/cbantiflickerplugin.tex?ds=inline

diff --git a/contrib/docs/latex/fl/cbantiflickerplugin.tex b/contrib/docs/latex/fl/cbantiflickerplugin.tex
index 01217e839e..785892b3e3 100644
--- a/contrib/docs/latex/fl/cbantiflickerplugin.tex
+++ b/contrib/docs/latex/fl/cbantiflickerplugin.tex
@@ -19,7 +19,7 @@ Locking for multithreaded applications is not yet implemented.
 
 \wxheading{Include files}
 
-<antiflickpl.h>
+<wx/fl/antiflickpl.h>
 
 \wxheading{Data structures}
 
