X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4bcfcdef85d9cfeaf9346babdbb8d7ed280da6d7..39434ba375389eab72ad84184d6d54a92c2b3551:/docs/latex/wx/closeevt.tex

diff --git a/docs/latex/wx/closeevt.tex b/docs/latex/wx/closeevt.tex
index 0880be8144..abb81d7e87 100644
--- a/docs/latex/wx/closeevt.tex
+++ b/docs/latex/wx/closeevt.tex
@@ -74,14 +74,6 @@ shutting down. This method can only be called for end session and query end
 session events, it doesn't make sense for close window event.
 
 
-\membersection{wxCloseEvent::GetForce}\label{wxcloseeventgetforce}
-
-\constfunc{bool}{GetForce}{\void}
-
-Returns true if the application wishes to force the window to close.
-This will shortly be obsolete, replaced by CanVeto.
-
-
 \membersection{wxCloseEvent::SetCanVeto}\label{wxcloseeventsetcanveto}
 
 \func{void}{SetCanVeto}{\param{bool}{ canVeto}}
