X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/499b2ed82caa62ec19b400c31aa26be33b1c02d4..85247b36714d520cf2ebb92fe6b4fc039f2db9d0:/contrib/docs/latex/fl/cbbardimhandlerbase.tex?ds=sidebyside

diff --git a/contrib/docs/latex/fl/cbbardimhandlerbase.tex b/contrib/docs/latex/fl/cbbardimhandlerbase.tex
index 7b8522a498..b66e9d154b 100644
--- a/contrib/docs/latex/fl/cbbardimhandlerbase.tex
+++ b/contrib/docs/latex/fl/cbbardimhandlerbase.tex
@@ -1,6 +1,6 @@
 %
 % automatically generated by HelpGen $Revision$ from
-% controlbar.h at 05/Jan/02 22:50:58
+% controlbar.h at 21/Jan/02 21:14:13
 %
 
 
@@ -8,15 +8,19 @@
 
 
 Abstract interface for bar-size handler classes.
-   These objects receive notifications, whenever the docking
-   state of the bar is changed, thus they have a possibility
-   to adjust the values in cbDimInfo::mSizes accordingly.
-   Specific handlers can be hooked to specific types of bars.
- 
+These objects receive notifications whenever the docking
+state of the bar is changed, thus they provide the possibility
+to adjust the values in cbDimInfo::mSizes accordingly.
+Specific handlers can be hooked up to specific types of bar.
+
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<controlbar.h>
+
 \wxheading{Data structures}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -28,28 +32,35 @@ Abstract interface for bar-size handler classes.
 
 to multiple bars, it's instance is
 reference-counted
-initial reference count is 0, since handler is not used, until the
-first invocation of AddRef()
+Default constructor. The initial reference count is 0, since
+the handler is not used until the first invocation of AddRef().
 
 
 \membersection{cbBarDimHandlerBase::AddRef}\label{cbbardimhandlerbaseaddref}
 
 \func{void}{AddRef}{\void}
 
+Increments the reference count.
+
 
 \membersection{cbBarDimHandlerBase::OnChangeBarState}\label{cbbardimhandlerbaseonchangebarstate}
 
 \func{void}{OnChangeBarState}{\param{cbBarInfo* }{pBar}, \param{int }{newState}}
 
-"bar-state-changes" notification
+Responds to "bar-state-changes" notifications.
 
 
 \membersection{cbBarDimHandlerBase::OnResizeBar}\label{cbbardimhandlerbaseonresizebar}
 
 \func{void}{OnResizeBar}{\param{cbBarInfo* }{pBar}, \param{const wxSize\& }{given}, \param{wxSize\& }{preferred}}
 
+Responds to bar resize notifications.
+
 
 \membersection{cbBarDimHandlerBase::RemoveRef}\label{cbbardimhandlerbaseremoveref}
 
 \func{void}{RemoveRef}{\void}
 
+Decrements the reference count, and if the count is at zero,
+delete 'this'.
+
