X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/49742d4ecc295b12cf0f557089b2b64a6b1131a2..b669780b33dc9af49b33d8b8ae1b399ad8c97ae5:/docs/latex/wx/tdb.tex

diff --git a/docs/latex/wx/tdb.tex b/docs/latex/wx/tdb.tex
index bc458335d4..9319c7d775 100644
--- a/docs/latex/wx/tdb.tex
+++ b/docs/latex/wx/tdb.tex
@@ -920,8 +920,8 @@ and OS on which the program will be compiled/run is Unicode capable.
 
 The one major difference in writing code that can be compiled in either 
 unicode or non-unicode builds that is specific to the wxODBC classes is to 
-use the SQL_C_WXCHAR datatype for string columns rather than SQL_C_CHAR or 
-SQL_C_WCHAR.
+use the SQL\_C\_WXCHAR datatype for string columns rather than SQL\_C\_CHAR or 
+SQL\_C\_WCHAR.
 
 \subsection{wxODBC - Sample Code}\label{wxodbcsamplecode1}
 
