X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/47fe7ff3821c632b490b16da6b5113f127905a23..39434ba375389eab72ad84184d6d54a92c2b3551:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index ae311235b4..7fb5832297 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -341,16 +341,24 @@ Returns whether the repetition counting mode is enabled.
 
 \membersection{wxLog::SetTimestamp}\label{wxlogsettimestamp}
 
-\func{void}{SetTimestamp}{\param{const wxStrgin\&}{ format}}
+\func{static void}{SetTimestamp}{\param{const wxString\&}{ format}}
 
 Sets the timestamp format prepended by the default log targets to all
 messages. The string may contain any normal characters as well as \%
 prefixed format specificators, see {\it strftime()} manual for details.
-Passing a NULL value (not empty string) to this function disables message timestamping.
+Passing an empty string to this function disables message time stamping.
+
+\membersection{wxLog::DisableTimestamp}\label{wxlogdisabletimestamp}
+
+\func{void}{SetTimestamp}{\param{const wxString\&}{ format}}
+
+Disables time stamping of the log messages.
+
+\newsince{2.9}
 
 \membersection{wxLog::GetTimestamp}\label{wxloggettimestamp}
 
-\constfunc{const wxString\&}{GetTimestamp}{\void}
+\func{static const wxString\&}{GetTimestamp}{\void}
 
 Returns the current timestamp format string.
 
@@ -363,6 +371,8 @@ section for details.
 
 \membersection{wxLog::GetTraceMask}\label{wxloggettracemask}
 
+\func{static wxTraceMask}{GetTraceMask}{\void}
+
 Returns the current trace mask, see \helpref{Customization}{wxlogcustomization} section
 for details.
 
