X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/47fe7ff3821c632b490b16da6b5113f127905a23..134198f1b773199b5506c302bf9510831d0319f5:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index ae311235b4..7a606ef27c 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -34,6 +34,10 @@ No base class
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Function groups}}}
 
 \membersection{Global functions}
@@ -341,16 +345,24 @@ Returns whether the repetition counting mode is enabled.
 
 \membersection{wxLog::SetTimestamp}\label{wxlogsettimestamp}
 
-\func{void}{SetTimestamp}{\param{const wxStrgin\&}{ format}}
+\func{static void}{SetTimestamp}{\param{const wxString\&}{ format}}
 
 Sets the timestamp format prepended by the default log targets to all
 messages. The string may contain any normal characters as well as \%
 prefixed format specificators, see {\it strftime()} manual for details.
-Passing a NULL value (not empty string) to this function disables message timestamping.
+Passing an empty string to this function disables message time stamping.
+
+\membersection{wxLog::DisableTimestamp}\label{wxlogdisabletimestamp}
+
+\func{void}{SetTimestamp}{\param{const wxString\&}{ format}}
+
+Disables time stamping of the log messages.
+
+\newsince{2.9}
 
 \membersection{wxLog::GetTimestamp}\label{wxloggettimestamp}
 
-\constfunc{const wxString\&}{GetTimestamp}{\void}
+\func{static const wxString\&}{GetTimestamp}{\void}
 
 Returns the current timestamp format string.
 
@@ -363,6 +375,8 @@ section for details.
 
 \membersection{wxLog::GetTraceMask}\label{wxloggettracemask}
 
+\func{static wxTraceMask}{GetTraceMask}{\void}
+
 Returns the current trace mask, see \helpref{Customization}{wxlogcustomization} section
 for details.
 
@@ -419,6 +433,10 @@ delete wxLog::SetActiveTarget(...something else or NULL...);
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogChain::wxLogChain}\label{wxlogchainctor}
@@ -559,6 +577,10 @@ would be better written as:
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogNull::wxLogNull}\label{wxlognullctor}
@@ -588,12 +610,17 @@ don't want this to happen, use wxLogInterposerTemp instead.
 
 \wxheading{Derived from}
 
-\helpref{wxLogChain}{wxlogchain}
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogInterposer::wxLogInterposer}\label{wxloginterposerctor}
@@ -614,12 +641,17 @@ and/or \helpref{DoLogString}{wxlogdologstring} methods.
 
 \wxheading{Derived from}
 
-\helpref{wxLogChain}{wxlogchain}
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogInterposerTemp::wxLogInterposerTemp}\label{wxloginterposertempctor}
@@ -642,6 +674,10 @@ wxWidgets applications which send all the output to {\tt stderr}.
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxLogStream}{wxlogstream}
@@ -672,6 +708,10 @@ the standard iostream library support ({\tt wxUSE\_STD\_IOSTREAM} must be on).
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxLogStderr}{wxlogstderr},\\
@@ -728,7 +768,9 @@ them normally by showing the standard log dialog.
 
 \wxheading{Derived from}
 
-\helpref{wxLogInterposer}{wxloginterposer}
+\helpref{wxLogInterposer}{wxloginterposer}\\
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
