X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/47f7a3a7261cbcb97e39ad89ff239fb9af6c866f..a796957ae06c5be604b8f04968bc0bac5709030c:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index 4109e8c490..7db8f6c4ee 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -1,4 +1,4 @@
-\section{Log classes overview}\label{wxlogoverview}
+\section{wxLog classes overview}\label{wxlogoverview}
 
 Classes: \helpref{wxLog}{wxlog}, wxLogStderr,
 wxLogOstream, wxLogTextCtrl, wxLogWindow, wxLogGui, wxLogNull
@@ -92,7 +92,7 @@ works.
 wxWindows has the notion of a {\it log target}: it's just a class deriving
 from \helpref{wxLog}{wxlog}. As such, it implements the virtual functions of
 the base class which are called when a message is logged. Only one log target
-is {\it active} at any moment, this is the one used by \it{wxLogXXX()}
+is {\it active} at any moment, this is the one used by {\it wxLogXXX()}
 functions. The normal usage of a log object (i.e. object of a class derived
 from wxLog) is to install it as the active target with a call to {\it
 SetActiveTarget()} and it will be used automatically by all subsequent calls
