X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/47ce5c4a5a51b1c1d46f97a287a60c1cf2fb92c6..9f90d36595093dd267411b323c1e43b6a6f83289:/docs/latex/wx/filename.tex

diff --git a/docs/latex/wx/filename.tex b/docs/latex/wx/filename.tex
index 6044b2f3c2..311783e728 100644
--- a/docs/latex/wx/filename.tex
+++ b/docs/latex/wx/filename.tex
@@ -495,6 +495,17 @@ same as \helpref{GetPathSeparators}{wxfilenamegetpathseparators} except for VMS
 path format where $]$ is used at the end of the path part.
 
 
+\membersection{wxFileName::GetPathWithSep}\label{wxfilenamegetpathwithsep}
+
+\constfunc{wxString}{GetPathWithSep}{\param{wxPathFormat }{format = wxPATH\_NATIVE}}
+
+Returns the path with the trailing separator, useful for appending the name to
+the given path.
+
+This is the same as calling \helpref{GetPath}{wxfilenamegetpath}
+\texttt{(wxPATH\_GET\_VOLUME | wxPATH\_GET\_SEPARATOR, format)}.
+
+
 \membersection{wxFileName::GetShortPath}\label{wxfilenamegetshortpath}
 
 \constfunc{wxString}{GetShortPath}{\void}
@@ -502,6 +513,33 @@ path format where $]$ is used at the end of the path part.
 Return the short form of the path (returns identity on non-Windows platforms).
 
 
+\membersection{wxFileName::GetSize}\label{wxfilenamegetsize}
+
+\constfunc{wxULongLong}{GetSize}{\void}
+
+\func{static wxULongLong}{GetSize}{\param{const wxString\& }{filename}}
+
+Returns the size of this file (first form) or the size of the given file (second form).
+If the file does not exist or its size could not be read (because e.g. the file is locked
+by another process) the returned value is {\tt wxInvalidSize}.
+
+
+\membersection{wxFileName::GetHumanReadableSize}\label{wxfilenamegethumanreadablesize}
+
+\constfunc{wxString}{GetHumanReadableSize}{\param{const wxString\& }{failmsg = "Not available"}, \param{int }{precision = 1}}
+
+\func{static wxString}{GetHumanReadableSize}{\param{const wxULongLong\& }{bytes}, \param{const wxString\& }{nullsize = "Not available"}, \param{int }{precision = 1}}
+
+Returns the size of this file (first form) or the given number of bytes (second form)
+in a human-readable form.
+
+If the size could not be retrieved the {\tt failmsg} string is returned (first form).
+If {\tt bytes} is {\tt wxInvalidSize} or zero, then {\tt nullsize} is returned (second form).
+
+In case of success, the returned string is a floating-point number with {\tt precision} decimal digits
+followed by the size unit (B, kB, MB, GB, TB: respectively bytes, kilobytes, megabytes, gigabytes, terabytes).
+
+
 \membersection{wxFileName::GetTimes}\label{wxfilenamegettimes}
 
 \constfunc{bool}{GetTimes}{\param{wxDateTime* }{dtAccess}, \param{wxDateTime* }{dtMod}, \param{wxDateTime* }{dtCreate}}
