X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/47610ec22ab01dbc09307a88ab67c1c95f6ee3b1..a5ae8241de5d07fc10d8fa6ba9c0faa1457521b8:/docs/latex/wx/ipcservr.tex

diff --git a/docs/latex/wx/ipcservr.tex b/docs/latex/wx/ipcservr.tex
index 6657e20ea8..98a4d7bd96 100644
--- a/docs/latex/wx/ipcservr.tex
+++ b/docs/latex/wx/ipcservr.tex
@@ -46,7 +46,7 @@ the service name may be either an integer port identifier in
 which case an Internet domain socket will be used for the
 communications, or a valid file name (which shouldn't exist and
 will be deleted afterwards) in which case a Unix domain socket is
-created. FALSE is returned if the call failed (for example, the
+created. false is returned if the call failed (for example, the
 port number is already in use).
 
 \membersection{wxServer::OnAcceptConnection}\label{wxddeserveronacceptconnection}
