X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/46512126625d26b7c0f6f0a5e795063ce843f87c..daf5b37afdda9e8ab7f909e01ffd6387219a80ea:/docs/latex/wx/regkey.tex?ds=sidebyside

diff --git a/docs/latex/wx/regkey.tex b/docs/latex/wx/regkey.tex
index ac862814c8..c20ae973b9 100644
--- a/docs/latex/wx/regkey.tex
+++ b/docs/latex/wx/regkey.tex
@@ -44,6 +44,10 @@ None
 
 <wx/msw/registry.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{Example}
 
 \begin{verbatim}
@@ -144,7 +148,7 @@ Gets the name of the registry key.
 
 \membersection{wxRegKey::GetFirstKey}\label{wxregkeygetfirstkey}
 
-\func{bool}{GetKeyValue}{\param{wxString\&}{ strKeyName}, \param{long\&}{ lIndex}}
+\func{bool}{GetFirstKey}{\param{wxString\&}{ strKeyName}, \param{long\&}{ lIndex}}
 
 Gets the first key.
 
