X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4626c57c58bfb151d6e1d5177c180c18e91c6613..9f057af5efcd64383486a6d56b8a4703a0118abd:/docs/latex/wx/tokenizr.tex

diff --git a/docs/latex/wx/tokenizr.tex b/docs/latex/wx/tokenizr.tex
index 3caf7bf3d2..fade99915c 100644
--- a/docs/latex/wx/tokenizr.tex
+++ b/docs/latex/wx/tokenizr.tex
@@ -118,6 +118,8 @@ Returns the delimiter which ended scan for the last token returned by
 there had been no calls to this function yet or if it returned the trailing
 empty token in \texttt{wxTOKEN\_RET\_EMPTY\_ALL} mode.
 
+\newsince{2.7.0}
+
 
 \membersection{wxStringTokenizer::GetNextToken}\label{wxstringtokenizergetnexttoken}
 
