X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/461fb267e6401cb9fae35bc8bb1ae359b9631817..940bbac18f7ba7e1206951480193ab1dc82ec18c:/docs/latex/wx/cursor.tex

diff --git a/docs/latex/wx/cursor.tex b/docs/latex/wx/cursor.tex
index 868ade2575..1992f48e3a 100644
--- a/docs/latex/wx/cursor.tex
+++ b/docs/latex/wx/cursor.tex
@@ -10,7 +10,7 @@ conditional compilation will probably be required (see \helpref{wxIcon}{wxicon}
 an example).
 
 A single cursor object may be used in many windows (any subwindow type).
-The wxWindows convention is to set the cursor for a window, as in X,
+The wxWidgets convention is to set the cursor for a window, as in X,
 rather than to set it globally as in MS Windows, although a
 global \helpref{::wxSetCursor}{wxsetcursor} is also available for MS Windows use.
 
@@ -43,7 +43,7 @@ wxCROSS\_CURSOR}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxCursor::wxCursor}\label{wxcursorconstr}
+\membersection{wxCursor::wxCursor}\label{wxcursorctor}
 
 \func{}{wxCursor}{\void}
 
@@ -225,13 +225,13 @@ wxCursor down_cursor = wxCursor(down_bits, 32, 32,
 #endif
 \end{verbatim}
 
-\membersection{wxCursor::\destruct{wxCursor}}
+\membersection{wxCursor::\destruct{wxCursor}}\label{wxcursordtor}
 
 \func{}{\destruct{wxCursor}}{\void}
 
 Destroys the cursor. A cursor can be reused for more
 than one window, and does not get destroyed when the window is
-destroyed. wxWindows destroys all cursors on application exit, although
+destroyed. wxWidgets destroys all cursors on application exit, although
 it is best to clean them up explicitly.
 
 \membersection{wxCursor::Ok}\label{wxcursorok}
