X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/459d4207931244c83ae56e26583fcaab88d74ec1..5b222f1c9e0acb63c781675555c76f6129316eb1:/docs/latex/wx/htcell.tex

diff --git a/docs/latex/wx/htcell.tex b/docs/latex/wx/htcell.tex
index 0922d7cba8..6733cfabc5 100644
--- a/docs/latex/wx/htcell.tex
+++ b/docs/latex/wx/htcell.tex
@@ -16,7 +16,11 @@ perform special actions such as color or font change.
 
 \wxheading{Derived from}
 
-wxObject
+\helpref{wxObject}{wxobject}
+
+\wxheading{Include files}
+
+<wx/html/htmlcell.h>
 
 \wxheading{See Also}
 
@@ -129,6 +133,12 @@ Returns descent value of the cell (m\_Descent member).
 
 Returns height of the cell (m\_Height member).
 
+\membersection{wxHtmlCell::GetId}\label{wxhtmlcellgetid}
+
+\constfunc{virtual wxString}{GetId}{\void}
+
+Returns unique cell identifier if there is any, empty string otherwise.
+
 \membersection{wxHtmlCell::GetLink}\label{wxhtmlcellgetlink}
 
 \constfunc{virtual wxHtmlLinkInfo*}{GetLink}{\param{int }{x = 0}, \param{int }{y = 0}}
@@ -182,10 +192,10 @@ Returns width of the cell (m\_Width member).
 
 \func{virtual void}{Layout}{\param{int }{w}}
 
-This method performs 2 actions:
+This method performs two actions:
 
 \begin{enumerate}\itemsep=0pt
-\item adjusts cell's width according to the fact that maximal possible width is {\it w}.
+\item adjusts the cell's width according to the fact that maximal possible width is {\it w}.
 (this has sense when working with horizontal lines, tables etc.)
 \item prepares layout (=fill-in m\_PosX, m\_PosY (and sometimes m\_Height) members)
 based on actual width {\it w}
@@ -197,9 +207,9 @@ before calling Layout.
 
 \membersection{wxHtmlCell::OnMouseClick}\label{wxhtmlcellonmouseclick}
 
-\func{virtual void}{OnMouseClick}{\param{wxWindow* }{parent}, \param{int }{x}, \param{int }{y}, \param{const wxMouseEvent& }{event}}
+\func{virtual void}{OnMouseClick}{\param{wxWindow* }{parent}, \param{int}{x}, \param{int }{y}, \param{const wxMouseEvent\& }{event}}
 
-This function is simple event handler. Each time user clicks mouse button over a cell
+This function is simple event handler. Each time the user clicks mouse button over a cell
 within \helpref{wxHtmlWindow}{wxhtmlwindow} this method of that cell is called. Default behavior is
 that it calls \helpref{wxHtmlWindow::LoadPage}{wxhtmlwindowloadpage}.
 
@@ -217,11 +227,17 @@ you should use wxHtmlBinderCell instead.
 \docparam{left, middle, right}{boolean flags for mouse buttons. TRUE if the left/middle/right
 button is pressed, FALSE otherwise}
 
+\membersection{wxHtmlCell::SetId}\label{wxhtmlcellsetid}
+
+\func{void}{SetId}{\param{const wxString\& }{id}}
+
+Sets unique cell identifier. Default value is no identifier, i.e. empty string.
+
 \membersection{wxHtmlCell::SetLink}\label{wxhtmlcellsetlink}
 
 \func{void}{SetLink}{\param{const wxHtmlLinkInfo\& }{link}}
 
-Sets the hypertext link asocciated with this cell. (Default value
+Sets the hypertext link associated with this cell. (Default value
 is \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}("", "") (no link))
 
 \membersection{wxHtmlCell::SetNext}\label{wxhtmlcellsetnext}
@@ -229,7 +245,7 @@ is \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}("", "") (no link))
 \func{void}{SetNext}{\param{wxHtmlCell }{*cell}}
 
 Sets the next cell in the list. This shouldn't be called by user - it is
-to be used only by \helpref{wxHtmlContainerCell::InsertCell}{wxhtmlcontainercellinsertcell}
+to be used only by \helpref{wxHtmlContainerCell::InsertCell}{wxhtmlcontainercellinsertcell}.
 
 \membersection{wxHtmlCell::SetParent}\label{wxhtmlcellsetparent}
 
