X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/457e6c54a28bc20cf347ba921755d7d5b296aa2a..bf43ff9a903af9e4aa1fdfa72a6d048c0f4367db:/docs/latex/wx/ipvaddr.tex?ds=sidebyside

diff --git a/docs/latex/wx/ipvaddr.tex b/docs/latex/wx/ipvaddr.tex
index 1e2fddfdb5..b561a33bb6 100644
--- a/docs/latex/wx/ipvaddr.tex
+++ b/docs/latex/wx/ipvaddr.tex
@@ -29,7 +29,7 @@ or an IP-style address in dot notation (a.b.c.d)
 
 \wxheading{Return value}
 
-Returns TRUE on success, FALSE if something goes wrong
+Returns true on success, false if something goes wrong
 (invalid hostname or invalid IP address).
 
 %
@@ -54,7 +54,7 @@ Set the port to that corresponding to the specified {\it service}.
 
 \wxheading{Return value}
 
-Returns TRUE on success, FALSE if something goes wrong
+Returns true on success, false if something goes wrong
 (invalid service).
 
 %
@@ -69,7 +69,7 @@ Set the port to that corresponding to the specified {\it service}.
 
 \wxheading{Return value}
 
-Returns TRUE on success, FALSE if something goes wrong
+Returns true on success, false if something goes wrong
 (invalid service).
 
 %
@@ -98,7 +98,7 @@ to {\bf INADDR\_ANY}.
 
 \wxheading{Return value}
 
-Returns TRUE on success, FALSE if something went wrong.
+Returns true on success, false if something went wrong.
 
 %
 % LocalHost
@@ -115,5 +115,5 @@ hosts and avoid other small problems.
 
 \wxheading{Return value}
 
-Returns TRUE on success, FALSE if something went wrong.
+Returns true on success, false if something went wrong.
 
