X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/457e6c54a28bc20cf347ba921755d7d5b296aa2a..77436c4cbac2269e564dc4fcf4494a58feca0af4:/docs/latex/wx/droptrgt.tex

diff --git a/docs/latex/wx/droptrgt.tex b/docs/latex/wx/droptrgt.tex
index d601fb6242..eb9ca1eed6 100644
--- a/docs/latex/wx/droptrgt.tex
+++ b/docs/latex/wx/droptrgt.tex
@@ -11,7 +11,7 @@ the whole window area, but only a small portion of it. The normal sequence of ca
 \helpref{OnEnter}{wxdroptargetonenter}, possibly many times \helpref{OnDragOver}{wxdroptargetondragover},
 \helpref{OnDrop}{wxdroptargetondrop} and finally \helpref{OnData}{wxdroptargetondata}.
 
-See \helpref{Drag'n'Drop overview}{wxdndoverview} and \helpref{wxDataObject overview}{wxdataobjectoverview}
+See \helpref{Drag and drop overview}{wxdndoverview} and \helpref{wxDataObject overview}{wxdataobjectoverview}
 for more information.
 
 \wxheading{Derived from}
@@ -26,7 +26,7 @@ None
 
 \index{wxDragResult}wxDragResult is defined as follows:
 
-{\small\begin{verbatim}
+\begin{verbatim}
 enum wxDragResult
 {
     wxDragError,    // error prevented the d&d operation from completing
@@ -36,7 +36,6 @@ enum wxDragResult
     wxDragCancel    // the operation was cancelled by user (not an error)
 };
 \end{verbatim}
-}
 
 \wxheading{See also}
 
