X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/457e6c54a28bc20cf347ba921755d7d5b296aa2a..281b0186b81a35b3eff658635b083b04a3cfa23c:/docs/latex/wx/droptrgt.tex

diff --git a/docs/latex/wx/droptrgt.tex b/docs/latex/wx/droptrgt.tex
index d601fb6242..235118dd32 100644
--- a/docs/latex/wx/droptrgt.tex
+++ b/docs/latex/wx/droptrgt.tex
@@ -26,7 +26,7 @@ None
 
 \index{wxDragResult}wxDragResult is defined as follows:
 
-{\small\begin{verbatim}
+\begin{verbatim}
 enum wxDragResult
 {
     wxDragError,    // error prevented the d&d operation from completing
@@ -36,7 +36,6 @@ enum wxDragResult
     wxDragCancel    // the operation was cancelled by user (not an error)
 };
 \end{verbatim}
-}
 
 \wxheading{See also}
 
