X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/44c4a3348693414bace13852e50d926c1aa9f08b..cf6ae2907c365869b10b61cbe3bde2768facd4d8:/docs/latex/wx/layalgor.tex

diff --git a/docs/latex/wx/layalgor.tex b/docs/latex/wx/layalgor.tex
index 81c39dfbfa..dc86bb2a1b 100644
--- a/docs/latex/wx/layalgor.tex
+++ b/docs/latex/wx/layalgor.tex
@@ -40,7 +40,7 @@ bottom of the remaining client area. This scheme implies that order of window cr
 Say you wish to have an extra toolbar at the top of the frame, a project window to the left of
 the MDI client window, and an output window above the status bar. You should therefore create
 the windows in this order: toolbar, output window, project window. This ensures that the toolbar and
-output window take up space at the top and bottom, and then the remaining height inbetween is used for
+output window take up space at the top and bottom, and then the remaining height in-between is used for
 the project window.
 
 wxLayoutAlgorithm is quite independent of the way in which
@@ -58,6 +58,10 @@ way of specifying layouts for which the normal constraint system is unsuitable.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/laywin.h>
+
 \wxheading{Event handling}
 
 The algorithm object does not respond to events, but itself generates the
@@ -114,6 +118,14 @@ Default constructor.
 
 Destructor.
 
+\membersection{wxLayoutAlgorithm::LayoutFrame}\label{wxlayoutalgorithmlayoutframe}
+
+\constfunc{bool}{LayoutFrame}{\param{wxFrame* }{frame}, \param{wxWindow*}{ mainWindow = NULL}}
+
+Lays out the children of a normal frame. {\it mainWindow} is set to occupy the remaining space.
+
+This function simply calls \helpref{wxLayoutAlgorithm::LayoutWindow}{wxlayoutalgorithmlayoutwindow}.
+
 \membersection{wxLayoutAlgorithm::LayoutMDIFrame}\label{wxlayoutalgorithmlayoutmdiframe}
 
 \constfunc{bool}{LayoutMDIFrame}{\param{wxMDIParentFrame* }{frame}, \param{wxRect*}{ rect = NULL}}
@@ -123,11 +135,14 @@ given rectangle will be used as a starting point instead of the frame's client a
 
 The MDI client window is set to occupy the remaining space.
 
-\membersection{wxLayoutAlgorithm::LayoutFrame}\label{wxlayoutalgorithmlayoutframe}
+\membersection{wxLayoutAlgorithm::LayoutWindow}\label{wxlayoutalgorithmlayoutwindow}
 
-\constfunc{bool}{LayoutFrame}{\param{wxFrame* }{frame}, \param{wxWindow*}{ mainWindow = NULL}}
+\constfunc{bool}{LayoutWindow}{\param{wxWindow* }{parent}, \param{wxWindow*}{ mainWindow = NULL}}
 
-Lays out the children of a normal frame.
+Lays out the children of a normal frame or other window.
 
-{\it mainWindow} is set to occupy the remaining space.
+{\it mainWindow} is set to occupy the remaining space. If this is not specified, then
+the last window that responds to a calculate layout event in query mode will get the remaining space
+(that is, a non-query OnCalculateLayout event will not be sent to this window and the window will be set
+to the remaining size).
 
