X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/449090b54d2e74bfd28c217bab25d11764ca38cc..c699b4583b6047191ac326728654c6fe8920aa7b:/docs/latex/wx/platinfo.tex

diff --git a/docs/latex/wx/platinfo.tex b/docs/latex/wx/platinfo.tex
index 4e6cab1973..e44d4d1a66 100644
--- a/docs/latex/wx/platinfo.tex
+++ b/docs/latex/wx/platinfo.tex
@@ -20,7 +20,11 @@ is running under and some basic architecture info of the machine where it's runn
 
 \wxheading{Include files}
 
-<include/wx/platinfo.h>
+<wx/platinfo.h>
+
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
 
 \wxheading{See also}
 
@@ -373,6 +377,7 @@ Returns the run-time minor version of the toolkit associated with this wxPlatfor
 Note that if \helpref{GetPortId}{wxplatforminfogetportid} returns wxPORT\_BASE, then this value is zero (unless externally modified with \helpref{SetToolkitVersion}{wxplatforminfosettoolkitversion}); that is, no native toolkit is in use.
 
 See \helpref{wxAppTraits::GetToolkitVersion}{wxapptraitsgettoolkitversion} for more info.
+
 \wxheading{See also}
 
 \helpref{CheckToolkitVersion}{wxplatforminfochecktoolkitversion}
