X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/43e8916ff3fd271e55c9daa6660cb8ea5ff7efe6..e0e742c32e28133dbd254de44b2a2188e4cb6644:/docs/latex/wx/statusbr.tex?ds=inline

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index a1d0f20dc0..f191f0d251 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -18,6 +18,10 @@ be variable length according to the size of the window.
 
 <wx/statusbr.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -45,7 +49,7 @@ from an {\bf OnSize} event handler.
 
 Default constructor.
 
-\func{}{wxStatusBar}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\func{}{wxStatusBar}{\param{wxWindow* }{parent}, \param{wxWindowID }{id = wxID\_ANY},\rtfsp
 \param{long}{ style = wxST\_SIZEGRIP},\rtfsp
 \param{const wxString\& }{name = ``statusBar"}}
 
@@ -75,7 +79,7 @@ Destructor.
 
 \membersection{wxStatusBar::Create}\label{wxstatusbarcreate}
 
-\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id = wxID\_ANY},\rtfsp
 \param{long}{ style = wxST\_SIZEGRIP},\rtfsp
 \param{const wxString\& }{name = ``statusBar"}}
 
@@ -203,7 +207,7 @@ the space left for all variable width fields is divided between them according
 to the absolute value of this number. A variable width field with width of $-2$
 gets twice as much of it as a field with width $-1$ and so on.
 
-For example, to create one fixed width field of width $50$ in the right part of
+For example, to create one fixed width field of width $100$ in the right part of
 the status bar and two more fields which get $66$\% and $33$\% of the remaining
 space correspondingly, you should use an array containing $-2$, $-1$ and $100$.
 
