X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/43e8916ff3fd271e55c9daa6660cb8ea5ff7efe6..a236aa2058ccf3d36e9cafc20fa7375080c4be50:/docs/latex/wx/tunicode.tex

diff --git a/docs/latex/wx/tunicode.tex b/docs/latex/wx/tunicode.tex
index 880a3f8da9..606859f61f 100644
--- a/docs/latex/wx/tunicode.tex
+++ b/docs/latex/wx/tunicode.tex
@@ -17,7 +17,7 @@ characters from languages other than English.
 
 \subsection{What is Unicode?}\label{whatisunicode}
 
-Starting with release 2.1 wxWidgets has support for compiling in Unicode mode
+wxWidgets has support for compiling in Unicode mode
 on the platforms which support it. Unicode is a standard for character
 encoding which addresses the shortcomings of the previous, 8 bit standards, by
 using at least 16 (and possibly 32) bits for encoding each character. This
@@ -162,7 +162,7 @@ ANSI strings (a notable exception is the entire Win32 API which accepts either
 Unicode or ANSI strings and which thus makes it unnecessary to ever perform
 any conversions in the program). GTK 2.0 only accepts UTF-8 strings.
 
-To get a ANSI string from a wxString, you may use the 
+To get an ANSI string from a wxString, you may use the 
 mb\_str() function which always returns an ANSI
 string (independently of the mode - while the usual 
 \helpref{c\_str()}{wxstringcstr} returns a pointer to the internal
@@ -170,14 +170,26 @@ representation which is either ASCII or Unicode). More rarely used, but still
 useful, is wc\_str() function which always returns
 the Unicode string.
 
+Sometimes it is also necessary to go from ANSI strings to wxStrings.  
+In this case, you can use the converter-constructor, as follows:
+ 
+\begin{verbatim}
+   const char* ascii_str = "Some text";
+   wxString str(ascii_str, wxConvUTF8);
+\end{verbatim}
+
+This code also compiles fine under a non-Unicode build of wxWidgets,
+but in that case the converter is ignored.
+
+For more information about converters and Unicode see
+the \helpref{wxMBConv classes overview}{mbconvclasses}.
+
 % TODO describe fn_str(), wx_str(), wxCharBuf classes, ...
 
 \subsection{Unicode-related compilation settings}\label{unicodesettings}
 
 You should define {\tt wxUSE\_UNICODE} to $1$ to compile your program in
-Unicode mode. Note that it currently only works in Win32 and GTK 2.0 and
-that some parts of
-wxWidgets are not Unicode-compliant yet. If you
+Unicode mode. This currently works for wxMSW, wxGTK, wxMac and wxX11. If you
 compile your program in ANSI mode you can still define {\tt wxUSE\_WCHAR\_T} 
 to get some limited support for {\tt wchar\_t} type.
 
