X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/43e8916ff3fd271e55c9daa6660cb8ea5ff7efe6..65baafba0e8cd74f2264b7e2f7625ff5bea84864:/docs/latex/wx/window.tex?ds=sidebyside

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index f5d55bf74b..322ca2ae90 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -66,10 +66,9 @@ use this style in order to get the arrows or etc., but would still like to have
 normal keyboard navigation take place, you should create and send a
 wxNavigationKeyEvent in response to the key events for Tab and
 Shift-Tab.}
-\twocolitem{\windowstyle{wxNO\_FULL\_REPAINT\_ON\_RESIZE}}{Disables repainting
-the window completely when its size is changed - you will have to repaint the
-new window area manually if you use this style. Currently only has an effect for
-Windows.}
+\twocolitem{\windowstyle{wxNO\_FULL\_REPAINT\_ON\_RESIZE}}{On Windows, this style used to disable repainting
+the window completely when its size is changed. Since this behaviour is now the default, the style is now obsolete
+and no longer has an effect.}
 \twocolitem{\windowstyle{wxVSCROLL}}{Use this style to enable a vertical scrollbar.}
 \twocolitem{\windowstyle{wxHSCROLL}}{Use this style to enable a horizontal scrollbar.}
 \twocolitem{\windowstyle{wxALWAYS\_SHOW\_SB}}{If a window has scrollbars,
@@ -83,7 +82,9 @@ repainted, then children being painted over them. Windows only.}
 a complete redraw of the window whenever it is resized instead of redrawing
 just the part of the window affected by resizing. Note that this was the
 behaviour by default before 2.5.1 release and that if you experience redraw
-problems with the code which previously used to work you may want to try this.}
+problems with code which previously used to work you may want to try this.
+Currently this style applies on GTK+ 2 and Windows only, and full repainting is always
+done on other platforms.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
@@ -1497,8 +1498,11 @@ This is just a wrapper for \helpref{ScrollLines}{wxwindowscrolllines}$(-1)$.
 
 \func{void}{Lower}{\void}
 
-Lowers the window to the bottom of the window hierarchy if it is a managed window (dialog
-or frame).
+Lowers the window to the bottom of the window hierarchy.
+
+\wxheading{See also}
+
+\helpref{Raise}{wxwindowraise}
 
 
 \membersection{wxWindow::MakeModal}\label{wxwindowmakemodal}
@@ -2216,8 +2220,13 @@ remove the event handler.
 
 \func{void}{Raise}{\void}
 
-Raises the window to the top of the window hierarchy if it is a managed window (dialog
-or frame).
+Raises the window to the top of the window hierarchy.
+
+In current version of wxWidgets this works both for manage and child windows.
+
+\wxheading{See also}
+
+\helpref{Lower}{wxwindowlower}
 
 
 \membersection{wxWindow::Refresh}\label{wxwindowrefresh}
@@ -3132,16 +3141,20 @@ value should be used.}
 
 \docparam{sizeFlags}{Indicates the interpretation of other parameters. It is a bit list of the following:
 
-{\bf wxSIZE\_AUTO\_WIDTH}: a -1 width value is taken to indicate
+{\bf wxSIZE\_AUTO\_WIDTH}: a $-1$ width value is taken to indicate
 a wxWidgets-supplied default width.\\
-{\bf wxSIZE\_AUTO\_HEIGHT}: a -1 height value is taken to indicate
+{\bf wxSIZE\_AUTO\_HEIGHT}: a $-1$ height value is taken to indicate
 a wxWidgets-supplied default width.\\
 {\bf wxSIZE\_AUTO}: -1 size values are taken to indicate
 a wxWidgets-supplied default size.\\
 {\bf wxSIZE\_USE\_EXISTING}: existing dimensions should be used
 if -1 values are supplied.\\
-{\bf wxSIZE\_ALLOW\_MINUS\_ONE}: allow dimensions of -1 and less to be interpreted
+{\bf wxSIZE\_ALLOW\_MINUS\_ONE}: allow dimensions of $-1$ and less to be interpreted
 as real dimensions, not default values.
+{\bf wxSIZE\_FORCE}: normally, if the position and the size of the window are
+already the same as the parameters of this function, nothing is done. but with
+this flag a window resize may be forced even in this case (supported in wx
+2.6.2 and later and only implemented for MSW and ignored elsewhere currently)
 }
 
 \wxheading{Remarks}
@@ -3169,7 +3182,7 @@ implements the following methods:\par
 
 \membersection{wxWindow::SetSizeHints}\label{wxwindowsetsizehints}
 
-\func{virtual void}{SetSizeHints}{\param{int}{ minW=-1}, \param{int}{ minH=-1}, \param{int}{ maxW=-1}, \param{int}{ maxH=-1},
+\func{virtual void}{SetSizeHints}{\param{int}{ minW}, \param{int}{ minH}, \param{int}{ maxW=-1}, \param{int}{ maxH=-1},
  \param{int}{ incW=-1}, \param{int}{ incH=-1}}
 
 \func{void}{SetSizeHints}{\param{const wxSize\&}{ minSize},
