X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/43e8916ff3fd271e55c9daa6660cb8ea5ff7efe6..47fe7ff3821c632b490b16da6b5113f127905a23:/docs/latex/wx/boxsizer.tex

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 279896593d..4f75fb61a0 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -32,7 +32,7 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 Implements the calculation of a box sizer's dimensions and then sets
 the size of its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
 if the child is a window). It is used internally only and must not be called
-by the user. Documented for information.
+by the user (call Layout() if you want to resize). Documented for information.
 
 \membersection{wxBoxSizer::CalcMin}\label{wxboxsizercalcmin}
 
