X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/43e8916ff3fd271e55c9daa6660cb8ea5ff7efe6..2d918775fa4b1cb5172e4b9ceda27afe93b29e2a:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index a1d0f20dc0..261d762315 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -203,7 +203,7 @@ the space left for all variable width fields is divided between them according
 to the absolute value of this number. A variable width field with width of $-2$
 gets twice as much of it as a field with width $-1$ and so on.
 
-For example, to create one fixed width field of width $50$ in the right part of
+For example, to create one fixed width field of width $100$ in the right part of
 the status bar and two more fields which get $66$\% and $33$\% of the remaining
 space correspondingly, you should use an array containing $-2$, $-1$ and $100$.
 
