X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/42ff6409d9aff9ba1b771842a256feaeb40e28cd..dc9e1e56917ad9b448bd0087a2d1ae3c632c4db1:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index bab8c50278..ab0e451692 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -40,7 +40,7 @@ of messages.
 \membersection{Message buffering}
 
 Some of wxLog implementations, most notably the standard
-\helpref{wxLogGui}{wxloggui} class, buffer the messages (for example, to avoid
+wxLogGui class, buffer the messages (for example, to avoid
 showing the user a zillion of modal message boxes one after another - which
 would be really annoying). {\it Flush()} shows them all and clears the buffer
 contents. Although this function doesn't do anything if the buffer is already
