X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/418ab1e742d1da28f69f0871adc6df5f697bc7c0..0149e2778396dfac568e1d381b87b44282e12df5:/docs/latex/wx/glcontext.tex?ds=inline

diff --git a/docs/latex/wx/glcontext.tex b/docs/latex/wx/glcontext.tex
index cf6f8e5b28..c746f58127 100644
--- a/docs/latex/wx/glcontext.tex
+++ b/docs/latex/wx/glcontext.tex
@@ -51,5 +51,6 @@ with equivalent attributes as {\it win}.}
 
 Makes the OpenGL state that is represented by this rendering context current with the wxGLCanvas {\it win}.
 Note that {\it win} can be a different wxGLCanvas window than the one that was passed to the constructor of this rendering context.
-If { \it RC } is an object of type wxGLContext, the statements { \it RC.SetCurrent(win); } and { \it win.SetCurrent(RC); } are equivalent,
+If { \it RC } is an object of type wxGLContext, the statements {\it RC.SetCurrent(win);} and {\it win.SetCurrent(RC);} are equivalent,
 see \helpref{wxGLCanvas::SetCurrent}{wxglcanvassetcurrentrc}.
+
