X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4130b487dcbd6f7f8cbc3e724ddf752b3817559c..3da93aae505563c359f58b357e6c79cd117c5320:/docs/latex/wx/sbsizer.tex

diff --git a/docs/latex/wx/sbsizer.tex b/docs/latex/wx/sbsizer.tex
index 814f0f0be2..df5a8a5e45 100644
--- a/docs/latex/wx/sbsizer.tex
+++ b/docs/latex/wx/sbsizer.tex
@@ -5,7 +5,7 @@ box around the sizer. Note that this static box has to be created
 separately.
 
 See also \helpref{wxSizer}{wxsizer}, \helpref{wxStaticBox}{wxstaticbox} and
-  \helpref{wxBoxSizer}{wxboxsizer}.
+ \helpref{wxBoxSizer}{wxboxsizer}.
 
 \wxheading{Derived from}
 
@@ -26,4 +26,5 @@ as parameters - orient can be either of wxVERTICAL or wxHORIZONTAL.
 
 \func{wxStaticBox*}{GetStaticBox}{\void}
 
-Returns the static box associated with the sizer.
\ No newline at end of file
+Returns the static box associated with the sizer.
+
