X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/412a5c570d18aa64f0077a3278ca232776f3f259..5c35d5c1d984f46d33e8181c907936e96160d795:/docs/latex/wx/wxstring.tex?ds=sidebyside

diff --git a/docs/latex/wx/wxstring.tex b/docs/latex/wx/wxstring.tex
index 1ed930cc20..85529acf02 100644
--- a/docs/latex/wx/wxstring.tex
+++ b/docs/latex/wx/wxstring.tex
@@ -897,7 +897,7 @@ Prepends {\it str} to this string, returning a reference to this string.
 Similar to the standard function {\it sprintf()}. Returns the number of
 characters written, or an integer less than zero on error.
 
-Note that if {\tt wxUSE_PRINTF_POS_PARAMS} is set to 1, then this function supports
+Note that if {\tt wxUSE\_PRINTF\_POS\_PARAMS} is set to 1, then this function supports
 Unix98-style positional parameters:
 
 \begin{verbatim}
