X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/411165f3f40f411d6feba4d13d4934f7fff6cc4f..c663fbea6851207b4e0ac3e362868c23b1494a46:/docs/latex/wx/process.tex?ds=inline

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index e3ced73249..dc5f0d92f4 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -48,7 +48,7 @@ for explicit destruction.}
 \func{}{wxProcess}{\param{int }{flags}}
 
 Constructs a process object. {\it id} is only used in the case you want to
-use wxWindows events. It identifies this object, or another window that will
+use wxWidgets events. It identifies this object, or another window that will
 receive the event.
 
 If the {\it parent} parameter is different from NULL, it will receive
@@ -125,7 +125,7 @@ See \helpref{wxProcess::Redirect}{wxprocessredirect}.
 
 \constfunc{bool}{IsErrorAvailable}{\void}
 
-Returns {\tt TRUE} if there is data to be read on the child process standard
+Returns {\tt true} if there is data to be read on the child process standard
 error stream.
 
 \wxheading{See also}
@@ -136,9 +136,9 @@ error stream.
 
 \constfunc{bool}{IsInputAvailable}{\void}
 
-Returns {\tt TRUE} if there is data to be read on the child process standard
+Returns {\tt true} if there is data to be read on the child process standard
 output stream. This allows to write simple (and extremely inefficient)
-polling-based code waiting for a better mechanism in future wxWindows versions.
+polling-based code waiting for a better mechanism in future wxWidgets versions.
 
 See the \helpref{exec sample}{sampleexec} for an example of using this
 function.
@@ -151,7 +151,7 @@ function.
 
 \constfunc{bool}{IsInputOpened}{\void}
 
-Returns {\tt TRUE} if the child process standard output stream is opened.
+Returns {\tt true} if the child process standard output stream is opened.
 
 \membersection{wxProcess::Kill}\label{wxprocesskill}
 
@@ -208,7 +208,7 @@ enum wxKillError
 
 \func{static bool}{Exists}{\param{int}{ pid}}
 
-Returns {\tt TRUE} if the given process exists in the system.
+Returns {\tt true} if the given process exists in the system.
 
 \wxheading{See also}
 
@@ -220,7 +220,7 @@ Returns {\tt TRUE} if the given process exists in the system.
 \constfunc{void}{OnTerminate}{\param{int}{ pid}, \param{int}{ status}}
 
 It is called when the process with the pid {\it pid} finishes.
-It raises a wxWindows event when it isn't overridden.
+It raises a wxWidgets event when it isn't overridden.
 
 \docparam{pid}{The pid of the process which has just terminated.}
 
