X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/411165f3f40f411d6feba4d13d4934f7fff6cc4f..3ac7b44cc0765b8444324d71b58cf648009d41c2:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index e3ced73249..6a9f9d0dc9 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -125,7 +125,7 @@ See \helpref{wxProcess::Redirect}{wxprocessredirect}.
 
 \constfunc{bool}{IsErrorAvailable}{\void}
 
-Returns {\tt TRUE} if there is data to be read on the child process standard
+Returns {\tt true} if there is data to be read on the child process standard
 error stream.
 
 \wxheading{See also}
@@ -136,7 +136,7 @@ error stream.
 
 \constfunc{bool}{IsInputAvailable}{\void}
 
-Returns {\tt TRUE} if there is data to be read on the child process standard
+Returns {\tt true} if there is data to be read on the child process standard
 output stream. This allows to write simple (and extremely inefficient)
 polling-based code waiting for a better mechanism in future wxWindows versions.
 
@@ -151,7 +151,7 @@ function.
 
 \constfunc{bool}{IsInputOpened}{\void}
 
-Returns {\tt TRUE} if the child process standard output stream is opened.
+Returns {\tt true} if the child process standard output stream is opened.
 
 \membersection{wxProcess::Kill}\label{wxprocesskill}
 
@@ -208,7 +208,7 @@ enum wxKillError
 
 \func{static bool}{Exists}{\param{int}{ pid}}
 
-Returns {\tt TRUE} if the given process exists in the system.
+Returns {\tt true} if the given process exists in the system.
 
 \wxheading{See also}
 
