X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/410bfc938346c4326f455631dd795e7d12cbc43e..7e1897c067ddb8218e05e0751cfe3e0521a5bfba:/docs/latex/wx/vscroll.tex

diff --git a/docs/latex/wx/vscroll.tex b/docs/latex/wx/vscroll.tex
index b6fa2c29d2..d75c477519 100644
--- a/docs/latex/wx/vscroll.tex
+++ b/docs/latex/wx/vscroll.tex
@@ -299,3 +299,4 @@ Return {\tt true} if we scrolled the window, {\tt false} if nothing was done.
 Set the number of lines the window contains: the derived class must
 provide the heights for all lines with indices up to the one given here
 in its \helpref{OnGetLineHeight()}{wxvscrolledwindowongetlineheight}.
+
