X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/410bfc938346c4326f455631dd795e7d12cbc43e..5c35d5c1d984f46d33e8181c907936e96160d795:/docs/latex/wx/htmllbox.tex

diff --git a/docs/latex/wx/htmllbox.tex b/docs/latex/wx/htmllbox.tex
index 08500a998b..2cdd92b8c0 100644
--- a/docs/latex/wx/htmllbox.tex
+++ b/docs/latex/wx/htmllbox.tex
@@ -147,3 +147,4 @@ Called when the user clicks on hypertext link. Does nothing by default.
 \wxheading{See also}
 
 See also \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}.
+
