X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4104ed92a537f36f7f41ce07d34cadbe4d78685c..e490e26798196f61e9aa7fd668ed6489b5c203a5:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index b14ab02ec5..0318e25402 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -471,17 +471,23 @@ processes.
 
 \func{long}{wxExecute}{\param{const wxString\& }{command}, \param{int }{sync = wxEXEC\_ASYNC}, \param{wxProcess *}{callback = NULL}}
 
+\perlnote{In wxPerl this function is called \texttt{Wx::ExecuteCommand}}
+
 \func{long}{wxExecute}{\param{char **}{argv}, \param{int }{flags = wxEXEC\_ASYNC}, \param{wxProcess *}{callback = NULL}}
 
+\perlnote{In wxPerl this function is called \texttt{Wx::ExecuteArgs}}
+
 \func{long}{wxExecute}{\param{const wxString\& }{command}, \param{wxArrayString\& }{output}}
 
-\perlnote{In wxPerl this function only takes the {\tt command} argument,
+\perlnote{In wxPerl this function is called \texttt{Wx::ExecuteStdout} and it
+only takes the {\tt command} argument,
 and returns a 2-element list {\tt ( status, output )}, where {\tt output} is
 an array reference.}
 
 \func{long}{wxExecute}{\param{const wxString\& }{command}, \param{wxArrayString\& }{output}, \param{wxArrayString\& }{errors}}
 
-\perlnote{In wxPerl this function only takes the {\tt command} argument,
+\perlnote{In wxPerl this function is called \texttt{Wx::ExecuteStdoutStderr} 
+and it only takes the {\tt command} argument,
 and returns a 3-element list {\tt ( status, output, errors )}, where
 {\tt output} and {\tt errors} are array references.}
 
@@ -1512,8 +1518,6 @@ same macro which is {\tt \_TEXT()}).
 
 Don't confuse this macro with \helpref{\_()}{underscore}!
 
-\membersection{\_}\label{underscore}
-
 \section{Dialog functions}\label{dialogfunctions}
 
 Below are a number of convenience functions for getting input from the
@@ -1950,7 +1954,7 @@ For example:
   int answer = wxMessageBox("Quit program?", "Confirm",
                             wxYES_NO | wxCANCEL, main_frame);
   if (answer == wxYES)
-    delete main_frame;
+    main_frame->Close();
   ...
 \end{verbatim}
 
@@ -2370,7 +2374,7 @@ in one line
 This macro makes this slightly less painful by allowing you to specify the
 type only once, as the first parameter, and creating a variable of this type
 named after the function but with {\tt pfn} prefix and initialized with the
-function \arg{name} from the \helpref{wxDynamicLibrary}{wxDynamicLibrary} 
+function \arg{name} from the \helpref{wxDynamicLibrary}{wxdynamiclibrary} 
 \arg{dynlib}.
 
 \wxheading{Parameters}
