X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4104ed92a537f36f7f41ce07d34cadbe4d78685c..2c6f14e1a7b5062fcf77eda40824d820d9ac288e:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index b14ab02ec5..ffd7eb45df 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -2370,7 +2370,7 @@ in one line
 This macro makes this slightly less painful by allowing you to specify the
 type only once, as the first parameter, and creating a variable of this type
 named after the function but with {\tt pfn} prefix and initialized with the
-function \arg{name} from the \helpref{wxDynamicLibrary}{wxDynamicLibrary} 
+function \arg{name} from the \helpref{wxDynamicLibrary}{wxdynamiclibrary} 
 \arg{dynlib}.
 
 \wxheading{Parameters}
