X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/40b480c35de6bb004aa676e55f697b833156e402..a3a7f8791c22fb931709cce7a915283135315dca:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 368252e9a7..5cc9320525 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -43,10 +43,10 @@ Destructor.
 This function returns the last error.
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxStream_NOERROR}}{No error occured.}
-\twocolitem{{\bf wxStream_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxStream_WRITE_ERR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxStream_READ_ERR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxStream\_NOERROR}}{No error occured.}
+\twocolitem{{\bf wxStream\_EOF}}{An End-Of-File occured.}
+\twocolitem{{\bf wxStream\_WRITE\_ERR}}{A generic error occured on the last write call.}
+\twocolitem{{\bf wxStream\_READ\_ERR}}{A generic error occured on the last read call.}
 \end{twocollist}
 
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
@@ -76,9 +76,9 @@ real position in the stream.
 
 See \helpref{OnSysRead}{wxstreambaseonsysread}.
 
-\membersection{wxStreamBase::StreamSize}
+\membersection{wxStreamBase::GetSize}\label{wxstreambasegetsize}
 
-\constfunc{size\_t}{StreamSize}{\void}
+\constfunc{size\_t}{GetSize}{\void}
 
 This function returns the size of the stream. For example, for a file it is the size of
 the file).
@@ -86,7 +86,7 @@ the file).
 \wxheading{Warning}
 
 There are streams which do not have size by definition, such as socket streams.
-In that cases, StreamSize returns an invalid size represented by
+In that cases, GetSize returns an invalid size represented by
 
 \begin{verbatim}
 ~(size_t)0
