X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/40b480c35de6bb004aa676e55f697b833156e402..7b3be6cb27e2c01f3cf4c14c9859d9fe0199b124:/docs/latex/wx/inputstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index ec8d55353f..0b940c020f 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -74,7 +74,7 @@ The buffer absolutely needs to have at least the specified size.
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
 
-\func{wxInputStream\&}{Read}{\param{wxOutputStream\&}{ stream_out}}
+\func{wxInputStream\&}{Read}{\param{wxOutputStream\&}{ stream\_out}}
 
 Reads data from the input queue and stores it in the specified output stream.
 The data is read until an error is raised by one of the two streams.
