X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4072ec3546f97dbe31ead5e695a50f65317ff3de..ec59d2ccea39b0225f49e6dd326d4d11940d656d:/docs/latex/wx/toolbar.tex?ds=sidebyside

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index c5c7dc3a4f..5be98e077a 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -41,26 +41,36 @@ often have to be made in order to get optimal look on all platforms as some plat
 ignore the values for explicit placement and use their own layout and the meaning
 of a "separator" is a vertical line under Windows95 vs. simple space under GTK etc.
 
-{\bf wxToolBar95:} Note that this toolbar paints tools to reflect user-selected colours.
-The toolbar orientation must always be {\bf wxHORIZONTAL}.
+{\bf wxToolBar95:} Note that this toolbar paints tools to reflect system-wide colours.
+If you use more than 16 colours in your tool bitmaps, you may wish to suppress
+this behaviour, otherwise system colours in your bitmaps will inadvertently be
+mapped to system colours. To do this, set the {\tt msw.remap} system option
+before creating the toolbar:
 
-{\bf wxToolBarGtk:} The toolbar orientation is ignored and is always {\bf wxHORIZONTAL}.
+\begin{verbatim}
+  wxSystemOptions::SetOption(wxT("msw.remap"), 0);
+\end{verbatim}
 
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxTB\_FLAT}}{Gives the toolbar a flat look ('coolbar' or 'flatbar' style). Windows 95 and GTK 1.2 only.}
-\twocolitem{\windowstyle{wxTB\_DOCKABLE}}{Makes the toolbar floatable and dockable. GTK only.}
-\twocolitem{\windowstyle{wxTB\_HORIZONTAL}}{Specifies horizontal layout.}
-\twocolitem{\windowstyle{wxTB\_VERTICAL}}{Specifies vertical layout (not available for the GTK and Windows 95
-toolbar).}
-\twocolitem{\windowstyle{wxTB\_3DBUTTONS}}{Gives wxToolBarSimple a mild 3D look to its buttons.}
-\twocolitem{\windowstyle{wxTB\_TEXT}}{Show the text in the toolbar buttons, by default only icons are shown}
-\twocolitem{\windowstyle{wxTB\_NOICONS}}{Doesn't show the icons in the toolbar buttons, by default they are shown}
+\twocolitem{\windowstyle{wxTB\_FLAT}}{Gives the toolbar a flat look (Windows and GTK only).}
+\twocolitem{\windowstyle{wxTB\_DOCKABLE}}{Makes the toolbar floatable and dockable (GTK only).}
+\twocolitem{\windowstyle{wxTB\_HORIZONTAL}}{Specifies horizontal layout (default).}
+\twocolitem{\windowstyle{wxTB\_VERTICAL}}{Specifies vertical layout.}
+\twocolitem{\windowstyle{wxTB\_TEXT}}{Shows the text in the toolbar buttons; by default only icons are shown.}
+\twocolitem{\windowstyle{wxTB\_NOICONS}}{Specifies no icons in the toolbar buttons; by default they are shown.}
+\twocolitem{\windowstyle{wxTB\_NODIVIDER}}{Specifies no divider (border) above the toolbar (Windows only).}
+\twocolitem{\windowstyle{wxTB\_NOALIGN}}{Specifies no alignment with the parent window (Windows only, not very useful).}
+\twocolitem{\windowstyle{wxTB\_HORZ\_LAYOUT}}{Shows the text and the icons alongside, not vertically stacked (Windows and GTK
+2 only). This style must be used with wxTB\_TEXT.}
+\twocolitem{\windowstyle{wxTB\_HORZ\_TEXT}}{Combination of wxTB\_HORZ\_LAYOUT and wxTB\_TEXT.}
 \end{twocollist}
 
-See also \helpref{window styles overview}{windowstyles}.
+See also \helpref{window styles overview}{windowstyles}. Note that the Win32
+native toolbar ignores {\tt wxTB\_NOICONS} style. Also, toggling the 
+{\tt wxTB\_TEXT} works only if the style was initially on.
 
 \wxheading{Event handling}
 
@@ -68,26 +78,18 @@ The toolbar class emits menu commands in the same was that a frame menubar does,
 so you can use one EVT\_MENU macro for both a menu item and a toolbar button.
 The event handler functions take a wxCommandEvent argument. For most event macros,
 the identifier of the tool is passed, but for EVT\_TOOL\_ENTER the toolbar
-window is passed and the tool id is retrieved from the wxCommandEvent.
-This is because the id may be -1 when the mouse moves off a tool, and -1 is not
+window identifier is passed and the tool identifier is retrieved from the wxCommandEvent.
+This is because the identifier may be -1 when the mouse moves off a tool, and -1 is not
 allowed as an identifier in the event system.
 
-Note that tool commands (and UI update events for tools) are first sent to
-the focus window within the frame that contains the toolbar. If no window within the frame has the focus,
-then the events are sent directly to the toolbar (and up the hierarchy to the
-frame, depending on where the application has put its event handlers). This allows command and UI update
-handling to be processed by specific windows and controls, and not necessarily
-by the application frame.
-
 \twocolwidtha{7cm}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{{\bf EVT\_TOOL(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_CLICKED event
 (a synonym for wxEVT\_COMMAND\_MENU\_SELECTED). Pass the id of the tool.}
 \twocolitem{{\bf EVT\_MENU(id, func)}}{The same as EVT\_TOOL.}
 \twocolitem{{\bf EVT\_TOOL\_RANGE(id1, id2, func)}}{Process a wxEVT\_COMMAND\_TOOL\_CLICKED event
-for a range id identifiers. Pass the ids of the tools.}
+for a range of identifiers. Pass the ids of the tools.}
 \twocolitem{{\bf EVT\_MENU\_RANGE(id1, id2, func)}}{The same as EVT\_TOOL\_RANGE.}
-
 \twocolitem{{\bf EVT\_TOOL\_RCLICKED(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_RCLICKED event.
 Pass the id of the tool.}
 \twocolitem{{\bf EVT\_TOOL\_RCLICKED\_RANGE(id1, id2, func)}}{Process a wxEVT\_COMMAND\_TOOL\_RCLICKED event
@@ -170,24 +172,38 @@ Adds a separator for spacing groups of tools.
 
 \membersection{wxToolBar::AddTool}\label{wxtoolbaraddtool}
 
-\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
-\param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
+\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId},\rtfsp
+\param{const wxString\&}{ label},\rtfsp
+\param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{const wxString\& }{shortHelpString = ""},\rtfsp
+\param{wxItemKind}{ kind = wxITEM\_NORMAL}}
 
-\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
-\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
-\param{long}{ xPos = -1}, \param{long}{ yPos = -1},\rtfsp
-\param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
+\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId},\rtfsp
+\param{const wxString\&}{ label},\rtfsp
+\param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap},\rtfsp
+\param{wxItemKind}{ kind = wxITEM\_NORMAL},\rtfsp
+\param{const wxString\& }{shortHelpString = ""},
+\param{const wxString\& }{longHelpString = ""},\rtfsp
+\param{wxObject* }{clientData = NULL}}
+
+\func{wxToolBarTool*}{AddTool}{\param{wxToolBarTool* }{tool}}
 
 Adds a tool to the toolbar. The first (short and most commonly used) version
-adds a normal (and not a togglable) button without any associated client data.
+has fewer parameters than the full version at the price of not being able to
+specify some of the more rarely used button features. The last version allows
+to add an existing tool.
 
 \wxheading{Parameters}
 
 \docparam{toolId}{An integer by which
 the tool may be identified in subsequent operations.}
 
-\docparam{isToggle}{Specifies whether the tool is a toggle or not: a toggle tool may be in
-two states, whereas a non-toggle tool is just a button.}
+\docparam{kind}{May be wxITEM\_NORMAL for a normal button (default),
+wxITEM\_CHECK for a checkable tool (such tool stays pressed after it had been
+toggled) or wxITEM\_RADIO for a checkable tool which makes part of a radio
+group of tools each of which is automatically unchecked whenever another button
+in the group is checked}
 
 \docparam{bitmap1}{The primary tool bitmap for toggle and button tools.}
 
@@ -197,17 +213,15 @@ used for the on-state of a toggle tool (monochrome displays) or a black
 border is drawn around the tool (colour displays) or the pixmap is shown
 as a pressed button (GTK). }
 
-\docparam{xPos}{Specifies the x position of the tool if automatic layout is not suitable.}
+\docparam{shortHelpString}{This string is used for the tools tooltip}
 
-\docparam{yPos}{Specifies the y position of the tool if automatic layout is not suitable.}
+\docparam{longHelpString}{This string is shown in the statusbar (if any) of the
+parent frame when the mouse pointer is inside the tool}
 
 \docparam{clientData}{An optional pointer to client data which can be
 retrieved later using \helpref{wxToolBar::GetToolClientData}{wxtoolbargettoolclientdata}.}
 
-\docparam{shortHelpString}{This string is used for the tools tooltip}
-
-\docparam{longHelpString}{This string is shown in the statusbar (if any) of the
-parent frame when the mouse pointer is inside the tool}
+\docparam{tool}{The tool to be added.}
 
 \wxheading{Remarks}
 
@@ -216,10 +230,52 @@ order to have the tools appear.
 
 \wxheading{See also}
 
-\helpref{wxToolBar::AddSeparator}{wxtoolbaraddseparator},
-\helpref{wxToolBar::InsertTool}{wxtoolbarinserttool},
-\helpref{wxToolBar::DeleteTool}{wxtoolbardeletetool},
-\helpref{wxToolBar::Realize}{wxtoolbarrealize},
+\helpref{wxToolBar::AddSeparator}{wxtoolbaraddseparator},\rtfsp
+\helpref{wxToolBar::AddCheckTool}{wxtoolbaraddchecktool},\rtfsp
+\helpref{wxToolBar::AddRadioTool}{wxtoolbaraddradiotool},\rtfsp
+\helpref{wxToolBar::InsertTool}{wxtoolbarinserttool},\rtfsp
+\helpref{wxToolBar::DeleteTool}{wxtoolbardeletetool},\rtfsp
+\helpref{wxToolBar::Realize}{wxtoolbarrealize}
+
+\membersection{wxToolBar::AddCheckTool}\label{wxtoolbaraddchecktool}
+
+\func{wxToolBarTool*}{AddCheckTool}{\param{int}{ toolId},\rtfsp
+\param{const wxString\&}{ label},\rtfsp
+\param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{const wxBitmap\&}{ bitmap2},\rtfsp
+\param{const wxString\& }{shortHelpString = ""},\rtfsp
+\param{const wxString\& }{longHelpString = ""},\rtfsp
+\param{wxObject* }{clientData = NULL}}
+
+Adds a new check (or toggle) tool to the toolbar. The parameters are the same
+as in \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}.
+
+\wxheading{See also}
+
+\helpref{wxToolBar::AddTool}{wxtoolbaraddtool}
+
+\membersection{wxToolBar::AddRadioTool}\label{wxtoolbaraddradiotool}
+
+\func{wxToolBarTool*}{AddRadioTool}{\param{int}{ toolId},\rtfsp
+\param{const wxString\&}{ label},\rtfsp
+\param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{const wxBitmap\&}{ bitmap2},\rtfsp
+\param{const wxString\& }{shortHelpString = ""},\rtfsp
+\param{const wxString\& }{longHelpString = ""},\rtfsp
+\param{wxObject* }{clientData = NULL}}
+
+Adds a new radio tool to the toolbar. Consecutive radio tools form a radio
+group such that exactly one button in the group is pressed at any moment, in
+other words whenever a button in the group is pressed the previously pressed
+button is automatically released. You should avoid having the radio groups of
+only one element as it would be impossible for the user to use such button.
+
+By default, the first button in the radio group is initially pressed, the
+others are not.
+
+\wxheading{See also}
+
+\helpref{wxToolBar::AddTool}{wxtoolbaraddtool}
 
 \membersection{wxToolBar::DeleteTool}\label{wxtoolbardeletetool}
 
@@ -232,7 +288,7 @@ back later), you may use \helpref{RemoveTool}{wxtoolbarremovetool} instead.
 Note that it is unnecessary to call \helpref{Realize}{wxtoolbarrealize} for the
 change to take place, it will happen immediately.
 
-Returns TRUE if the tool was deleted, FALSE otherwise.
+Returns true if the tool was deleted, false otherwise.
 
 \wxheading{See also}
 
@@ -255,7 +311,7 @@ Enables or disables the tool.
 
 \docparam{toolId}{Tool to enable or disable.}
 
-\docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
+\docparam{enable}{If true, enables the tool, otherwise disables it.}
 
 {\bf NB:} This function should only be called after 
 \helpref{Realize}{wxtoolbarrealize}.
@@ -270,6 +326,20 @@ will change the visible state of the tool to indicate that it is disabled.
 \helpref{wxToolBar::GetToolEnabled}{wxtoolbargettoolenabled},\rtfsp
 \helpref{wxToolBar::ToggleTool}{wxtoolbartoggletool}
 
+\membersection{wxToolBar::FindById}\label{wxtoolbarfindbyid}
+
+\func{wxToolBarTool*}{FindById}{\param{int }{id}}
+
+Returns a pointer to the tool identified by {\it id} or
+NULL if no corresponding tool is found.
+
+\membersection{wxToolBar::FindControl}\label{wxtoolbarfindcontrol}
+
+\func{wxControl*}{FindControl}{\param{int }{id}}
+
+Returns a pointer to the control identified by {\it id} or
+NULL if no corresponding control is found.
+
 \membersection{wxToolBar::FindToolForPosition}\label{wxtoolbarfindtoolforposition}
 
 \constfunc{wxToolBarTool*}{FindToolForPosition}{\param{const float}{ x}, \param{const float}{ y}}
@@ -354,7 +424,7 @@ Called to determine whether a tool is enabled (responds to user input).
 
 \wxheading{Return value}
 
-TRUE if the tool is enabled, FALSE otherwise.
+true if the tool is enabled, false otherwise.
 
 \wxheading{See also}
 
@@ -385,6 +455,12 @@ Returns the value used for packing tools.
 
 \helpref{wxToolBar::SetToolPacking}{wxtoolbarsettoolpacking}
 
+\membersection{wxToolBar::GetToolPos}\label{wxtoolbargettoolpos}
+
+\constfunc{int}{GetToolPos}{\param{int }{toolId}}
+
+Returns the tool position in the toolbar, or wxNOT\_FOUND if the tool is not found.
+
 \membersection{wxToolBar::GetToolSeparation}\label{wxtoolbargettoolseparation}
 
 \constfunc{int}{GetToolSeparation}{\void}
@@ -422,7 +498,7 @@ Gets the on/off state of a toggle tool.
 
 \wxheading{Return value}
 
-TRUE if the tool is toggled on, FALSE otherwise.
+true if the tool is toggled on, false otherwise.
 
 \wxheading{See also}
 
@@ -458,9 +534,12 @@ You must call \helpref{Realize}{wxtoolbarrealize} for the change to take place.
 
 \func{wxToolBarTool *}{InsertTool}{\param{size\_t }{pos},\rtfsp
 \param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
-\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
+\param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = false},\rtfsp
 \param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
 
+\func{wxToolBarTool *}{InsertTool}{\param{size\_t }{pos},\rtfsp
+\param{wxToolBarTool* }{tool}}
+
 Inserts the tool with the specified attributes into the toolbar at the given
 position.
 
@@ -485,11 +564,11 @@ you should use the EVT\_MENU or EVT\_TOOL macro instead.
 
 \docparam{toolId}{The identifier passed to \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}.}
 
-\docparam{toggleDown}{TRUE if the tool is a toggle and the toggle is down, otherwise is FALSE.}
+\docparam{toggleDown}{true if the tool is a toggle and the toggle is down, otherwise is false.}
 
 \wxheading{Return value}
 
-If the tool is a toggle and this function returns FALSE, the toggle
+If the tool is a toggle and this function returns false, the toggle
 toggle state (internal and visual) will not be changed. This provides a way of
 specifying that toggle operations are not permitted in some circumstances.
 
@@ -553,9 +632,6 @@ A typical use of this member might be to pop up a menu.
 
 This function should be called after you have added tools.
 
-If you are using absolute positions for your tools when using a wxToolBarSimple object,
-do not call this function. You must call it at all other times.
-
 \membersection{wxToolBar::RemoveTool}\label{wxtoolbarremovetool}
 
 \func{wxToolBarTool *}{RemoveTool}{\param{int }{id}}
@@ -620,7 +696,7 @@ and not the eventual size of the tool button.
 
 \membersection{wxToolBar::SetToolClientData}\label{wxtoolbarsettoolclientdata}
 
-\func{void}{GetToolClientData}{\param{wxObject* }{clientData}}
+\func{void}{SetToolClientData}{\param{int }{id}, \param{wxObject* }{clientData}}
 
 Sets the client data associated with the tool.
 
@@ -708,7 +784,7 @@ Toggles a tool on or off. This does not cause any event to get emitted.
 
 \docparam{toolId}{Tool in question.}
 
-\docparam{toggle}{If TRUE, toggles the tool on, otherwise toggles it off.}
+\docparam{toggle}{If true, toggles the tool on, otherwise toggles it off.}
 
 \wxheading{Remarks}
 
@@ -718,4 +794,3 @@ Only applies to a tool that has been specified as a toggle tool.
 
 \helpref{wxToolBar::GetToolState}{wxtoolbargettoolstate}
 
-
