X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3faa8195d724c3951a6becd501c989ac3c3906ef..f415cab9ef1433413a1a68a982ee9b17c5a8deda:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 65e93f3724..d145636166 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -488,7 +488,7 @@ Sets the widths of the fields in the status bar.
 
 \wxheading{Parameters}
 
-\wxheading{n}{The number of fields in the status bar. It must be the
+\docparam{n}{The number of fields in the status bar. It must be the
 same used in \helpref{CreateStatusBar}{wxframecreatestatusbar}.}
 
 \docparam{widths}{Must contain an array of {\it n} integers, each of which is a status field width
