X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3faa8195d724c3951a6becd501c989ac3c3906ef..03cf4aa61da039f4331bfc788cc07850a50a0df5:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 65e93f3724..b7e00593e3 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -21,6 +21,10 @@ application windows.
 
 <wx/frame.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -211,7 +215,7 @@ Note that you can put controls and other windows on the status bar if you wish.
 
 \membersection{wxFrame::CreateToolBar}\label{wxframecreatetoolbar}
 
-\func{virtual wxToolBar*}{CreateToolBar}{\param{long}{ style = wxNO\_BORDER \pipe wxTB\_HORIZONTAL},
+\func{virtual wxToolBar*}{CreateToolBar}{\param{long}{ style = wxBORDER\_NONE \pipe wxTB\_HORIZONTAL},
  \param{wxWindowID}{ id = -1}, \param{const wxString\&}{ name = "toolBar"}}
 
 Creates a toolbar at the top or left of the frame.
@@ -488,7 +492,7 @@ Sets the widths of the fields in the status bar.
 
 \wxheading{Parameters}
 
-\wxheading{n}{The number of fields in the status bar. It must be the
+\docparam{n}{The number of fields in the status bar. It must be the
 same used in \helpref{CreateStatusBar}{wxframecreatestatusbar}.}
 
 \docparam{widths}{Must contain an array of {\it n} integers, each of which is a status field width
