X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3f54c58da2475b91a064a9757e52add56ed42527..41bd21684426f9b5e6d1aa5d530b33734f32a82d:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 6fb56019c6..0bdf7f669b 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -16,7 +16,7 @@ progress bar. Optionally, it can display an ABORT button.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxProgressDialog::wxProgressDialog}\label{wxprogressdialogconstr}
+\membersection{wxProgressDialog::wxProgressDialog}\label{wxprogressdialogctor}
 
 \func{}{wxProgressDialog}{\param{const wxString\& }{title},
  \param{const wxString\& }{message},\rtfsp
@@ -60,7 +60,7 @@ reached.}
 \end{twocollist}%
 }
 
-\membersection{wxProgressDialog::\destruct{wxProgressDialog}}
+\membersection{wxProgressDialog::\destruct{wxProgressDialog}}\label{wxprogressdialogdtor}
 
 \func{}{\destruct{wxMessageDialog}}{\void}
 
@@ -89,9 +89,9 @@ dialog may be resumed with \helpref{Resume}{wxprogressdialogresume} function.
 
 \wxheading{Parameters}
 
-\docparam{value}{The new value of the progress meter. It must be strictly less
-than the maximum value given to the constructor (i.e., as usual in C, the
-index runs from $0$ to $maximum-1$).}
+\docparam{value}{The new value of the progress meter. It should be less than or
+equal to the maximum value given to the constructor and the dialog is closed if
+it is equal to the maximum.}
 \docparam{newmsg}{The new messages for the progress dialog text, if it is
 empty (which is the default) the message is not changed.}
 
