X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3ed6c6f4acbb69db8711446912bc563b58c148ab..85136e3bf5dadf921652519e71da5db351fb3194:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index a8b885da0a..08eb57b3a8 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -88,15 +88,6 @@ A reasonable default is used if not specified.}
 \twocolitem{motif.largebuttons}{If 1, uses a bigger default size for wxButtons.}
 \end{twocollist}
 
-\wxheading{All}
-
-\twocolwidtha{7cm}
-\begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf Option}}{{\bf Value}}
-\twocolitem{sizer.desktopmargin.x}{The horizontal margin to subtract from the desktop size when computing the maximum top-level window size in wxSizer::Fit.}
-\twocolitem{sizer.desktopmargin.y}{The vertical margin to subtract from the desktop size when computing the maximum top-level window size in wxSizer::Fit.}
-\end{twocollist}
-
 The compile-time option to include or exclude this functionality
 is wxUSE\_SYSTEM\_OPTIONS.
 
