X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3e79fa7534162386335ee0d3994afe64c7fa2ca1..184686f6562c480cc129fb0cab8d229d10068c99:/docs/latex/wx/radiobox.tex

diff --git a/docs/latex/wx/radiobox.tex b/docs/latex/wx/radiobox.tex
index fd4490098b..5cd773a331 100644
--- a/docs/latex/wx/radiobox.tex
+++ b/docs/latex/wx/radiobox.tex
@@ -23,6 +23,8 @@ labelled buttons.
 maximum number of rows.}
 \twocolitem{\windowstyle{wxRA\_SPECIFY\_COLS}}{The major dimension parameter refers to the
 maximum number of columns.}
+\twocolitem{\windowstyle{wxRA\_USE\_CHECKBOX}}{Use of the checkbox controls instead of radio
+buttons (currently supported only on PalmOS)}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
@@ -174,10 +176,6 @@ Returns the number of items in the radiobox.
 
 Returns the radiobox label.
 
-\constfunc{wxString}{GetLabel}{\param{int }{n}}
-
-Returns the label for the given button.
-
 \wxheading{Parameters}
 
 \docparam{n}{The zero-based button index.}
@@ -221,9 +219,9 @@ Returns the label for the button at the given position.
 
 \constfunc{int}{Number}{\void}
 
-{\bf Obsolescence note:} This method is obsolete and was replaced with 
+{\bf Obsolescence note:} This method is obsolete and was replaced with
 \helpref{GetCount}{wxradioboxgetcount}, please use the new method in the new
-code. This method is only available if wxWidgets was compiled with 
+code. This method is only available if wxWidgets was compiled with
 {\tt WXWIN\_COMPATIBILITY\_2\_2} defined and will disappear completely in
 future versions.
 
@@ -235,9 +233,6 @@ Returns the number of buttons in the radiobox.
 
 Sets the radiobox label.
 
-\func{void}{SetLabel}{\param{int }{n}, \param{const wxString\&}{ label}}
-
-Sets a label for a radio button.
 
 \wxheading{Parameters}
 
