X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3e5bdb369b6d92fd17c2d0dadd67ee0cbd20bbcc..6294ac2e91af3408cfa04910b90ad7ace94f1220:/docs/latex/wx/pagedlg.tex?ds=sidebyside

diff --git a/docs/latex/wx/pagedlg.tex b/docs/latex/wx/pagedlg.tex
index f1a56a1299..c9e8dfc59d 100644
--- a/docs/latex/wx/pagedlg.tex
+++ b/docs/latex/wx/pagedlg.tex
@@ -1,7 +1,7 @@
 \section{\class{wxPageSetupDialog}}\label{wxpagesetupdialog}
 
 This class represents the page setup common dialog. The page setup dialog is standard from
-Windows 95 on, replacing the print setup dialog (which is retained in Windows and wxWindows
+Windows 95 on, replacing the print setup dialog (which is retained in Windows and wxWidgets
 for backward compatibility). On Windows 95 and NT 4.0 and above, the page setup dialog is
 native to the windowing system, otherwise it is emulated.
 
