X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3e58dcb9058f177d767c6f39baa88ee5626266a9..12ac619f42b81420980aec14afc9433af6f911dc:/docs/latex/wx/splitevt.tex

diff --git a/docs/latex/wx/splitevt.tex b/docs/latex/wx/splitevt.tex
index 1b57bba02d..7cf2b96e93 100644
--- a/docs/latex/wx/splitevt.tex
+++ b/docs/latex/wx/splitevt.tex
@@ -3,7 +3,7 @@
 This class represents the events generated by a splitter control. Also there is
 only one event class, the data associated to the different events is not the
 same and so not all accessor functions may be called for each event. The
-documentation mentions the kind of event(s) for which the given acessor
+documentation mentions the kind of event(s) for which the given accessor
 function makes sense: calling it for other types of events will result
 in assert failure (in debug mode) and will return meaningless results.
 
@@ -38,7 +38,7 @@ Processes a wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGED event.}
 \twocolitem{{\bf EVT\_SPLITTER\_UNSPLIT(id, func)}}{The splitter has been just
 unsplit. Processes a wxEVT\_COMMAND\_SPLITTER\_UNSPLIT event. This event can't
 be vetoed.}
-\twocolitem{{\bf EVT\_SPLITTER\_DOUBLECLICKED(id, func)}}{The sash was double
+\twocolitem{{\bf EVT\_SPLITTER\_DCLICK(id, func)}}{The sash was double
 clicked. The default behaviour is to unsplit the window when this happens
 (unless the minimum pane size has been set to a value greater than zero). This
 won't happen if you veto this event. Processes a
